BLEED 11.25 x 8.75  (1/8” beyond trim)
TRIM 11 x 8.5  (flat brochure size)
SAFE ZONE FOR TEXT  1/4” in from Trim and Folds
FOLD LINE

8.5 x 11”
Trifold
Brochure —
OUTSIDE

8.5 x 11”
Trifold
Brochure —
inside